\cdbalgorithm{timing}{}

Display a list of all algorithms together with the total time spent in
them since program start or since a \subscommand{reset}.
\begin{screen}{1}
@timing;
                             @           0  0 sec and 0 microsec
              @acanonicalorder           0  0 sec and 0 microsec
             @all_contractions           0  0 sec and 0 microsec
...
\end{screen}
~

\cdbseealgo{algorithms}
\cdbseealgo{properties}
