\cdbalgorithm{end}{}

This is a marker which can be used in an input file to make the
program stop reading (working just like ``{\tt
$\backslash$end\{document\}}'' does for \LaTeX{} or ``{\tt
$\backslash$end} for \TeX{}).

\cdbseealgo{quit}

